From 795d032a7eddb2de49a43cf3e770a71a3c3491ef Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Mon, 31 May 2021 11:31:19 +0200
Subject: updated to 2021/05/31

---
 ekdosis.dtx | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'ekdosis.dtx')

diff --git a/ekdosis.dtx b/ekdosis.dtx
index 3f0d062..6384763 100644
--- a/ekdosis.dtx
+++ b/ekdosis.dtx
@@ -61,7 +61,7 @@ along with this program.  If not, see
 %<package>\NeedsTeXFormat{LaTeX2e}[1999/12/01]
 %<package>\ProvidesPackage{ekdosis}
 %<*package>
-    [2021/05/30 v1.3-dev Typesetting TEI xml-compliant critical editions]
+    [2021/05/31 v1.3-dev Typesetting TEI xml-compliant critical editions]
 %</package>
 %<*driver>
 \begin{filecontents}[noheader,overwrite]{bibdata.xml}
@@ -7509,7 +7509,7 @@ Sample text with a \textcolor{red}{word} in red.
 %    \end{macrocode}
 % \end{macro}
 % \begin{macro}{\teidirect}
-% \changes{v1.3}{2021/05/30}{direct insertion of elements in the
+% \changes{v1.3}{2021/05/31}{direct insertion of elements in the
 % \texttt{TEI xml} file}
 % \cs{teidirect}\oarg{xml attributes}\marg{xml element}\marg{code}
 % does nothing in \LaTeX. Its only use is to insert elements in the
@@ -7868,7 +7868,7 @@ Sample text with a \textcolor{red}{word} in red.
 %    \end{macrocode}
 % \end{macro}
 % \begin{macro}{\SetApparatusNoteLanguage}
-% \changes{v1.3}{2021/05/30}{defines an alternate language to be
+% \changes{v1.3}{2021/05/31}{defines an alternate language to be
 % applied in note apparatus entries}
 % \cs{SetApparatusNoteLang}\marg{languagename} can be used when
 % it is needed to apply in entries introduced by the \cs{note} command
-- 
cgit v1.2.3

