From ce473df7031017eca46091ff11536ed53c532661 Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Thu, 8 Oct 2020 11:46:56 +0200
Subject: a typo

---
 icite.dtx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'icite.dtx')

diff --git a/icite.dtx b/icite.dtx
index 8c3e16f..f19675d 100644
--- a/icite.dtx
+++ b/icite.dtx
@@ -579,7 +579,7 @@
 % To process titles, \package{icite} uses the following entry fields:
 % \begin{description}
 % \item[title] The full title of the work.
-% \item[shorttitle] The title in an abbriged form. If this entry is
+% \item[shorttitle] The title in an abriged form. If this entry is
 % set, it takes precedence over the |title| field in the printed index.
 % \item[indextitle] This field may be used to have a title such as
 % \emph{The {\TeX}Book} printed in the index as \emph{{\TeX}Book, The}.
@@ -687,7 +687,7 @@
 % (\vrefrange{ref:indices}{ref:icite-bib} respectively). As can be
 % seen by comparing the bibliography generated in the footnotes with
 % the text printed in the index, \package{icite} prints as expected
-% the abbridged forms of the titles when they are
+% the abridged forms of the titles when they are
 % available. Furthermore, as a default citation command set in the
 % preamble, the \enquote*{oxnotes} Bib\LaTeX\ option of
 % \package{biblatex-oxref} style package makes \cs{autocite} behave
-- 
cgit v1.2.3

