From e7345f55176f96a2046782e76711ef275be296c4 Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Sat, 29 Aug 2020 10:09:43 +0200
Subject: s/maxnumber/maxentries

---
 ekdosis.dtx | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'ekdosis.dtx')

diff --git a/ekdosis.dtx b/ekdosis.dtx
index 20ba5ec..464674e 100644
--- a/ekdosis.dtx
+++ b/ekdosis.dtx
@@ -3854,11 +3854,11 @@ subtype="arabtex">'inna 'abI kAna mina
 % layer of apparatus criticus may accept as described above
 % \vpageref{ref:maxentries}. As a result, \pkg{ekdosis} will take care
 % of inserting automatic breakpoints between pages whenever the number
-% of entries on a given page reaches the value set as |maxnumber|.
+% of entries on a given page reaches the value set as |maxentries|.
 %
-% |maxnumber| must not be too small: otherwise offensive to look at
+% |maxentries| must not be too small: otherwise offensive to look at
 % vertical spaces may come between the edition text and the apparatus
-% criticus. Conversely, |maxnumber| must not be too big: otherwise,
+% criticus. Conversely, |maxentries| must not be too big: otherwise,
 % should entries overflow on a given page, the edition text and the
 % apparatus criticus may clash. As said above, a couple of clashes can
 % be managed with a couple of manually inserted page breaks. But if
-- 
cgit v1.2.3

