From 3894140d19231e00b61eca4af8d803514efaac3e Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Tue, 14 Dec 2021 18:54:52 +0100
Subject: use addlines package for the documentation

---
 ekdosis.dtx | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'ekdosis.dtx')

diff --git a/ekdosis.dtx b/ekdosis.dtx
index 973fcce..6c56066 100644
--- a/ekdosis.dtx
+++ b/ekdosis.dtx
@@ -589,6 +589,7 @@ along with this program.  If not, see
 \usepackage{chifoot}
 \usepackage{fixfoot}
 \usepackage[nospace,american]{varioref}
+\usepackage{addlines}
 \newcommand\phts{\phantomsection}
 \usepackage{nameref}
 \usepackage{arabluatex}
@@ -1918,10 +1919,10 @@ yesterday.
 % the related entry of the apparatus criticus. This mechanism is
 % useful in more than one respect. For instance, it can be used to
 % insert abbreviated lemmata in the apparatus criticus, or to
+% \addlines[-1]
 % introduce an alternate way of writing entries with Latin technical
 % terms in the apparatus criticus as will be demonstrated below in the
-% example
-% provided by \vref{lst:pj2}.\\
+% example provided by \vref{lst:pj2}.\\
 % \DescribeOption{sep} |sep|$=$\meta{separator}\\
 % |sep| allows to change the symbol used to separate the lemma text
 % from deviant readings, which is by default the closing square
-- 
cgit v1.2.3

