From dc3b3c81fe054b59f1f96604e434ed588c81c827 Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Mon, 20 Jun 2016 18:59:47 +0200
Subject: set Old Standard as the main font of the documentation

---
 arabluatex.dtx | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'arabluatex.dtx')

diff --git a/arabluatex.dtx b/arabluatex.dtx
index e6ac1d6..5138bb3 100644
--- a/arabluatex.dtx
+++ b/arabluatex.dtx
@@ -132,11 +132,11 @@
 \doxitem{Option}{option}{options}
 \def\actualchar{ =} % there's a bug in doxitem; quick fix.
 \usepackage{fontspec,luatextra}
-\defaultfontfeatures{RawFeature={+liga;+onum;+hlig}}
-\setmainfont{Libertinus Serif}
-\setsansfont{Libertinus Sans}
-\setmonofont{Libertinus Mono}[Scale=.9]
+\defaultfontfeatures{RawFeature={+liga}}
+\setmainfont{Old Standard}
+\newfontfamily\translitfont{Latin Modern Roman}[Ligatures=TeX]
 \usepackage{arabluatex}[2016/05/28]
+\SetTranslitFont{\translitfont}
 \usepackage{varioref}
 \usepackage{hypdoc}
 \hypersetup{unicode=true, colorlinks, allcolors=blue,
-- 
cgit v1.2.3

