From 776312c1802f9ad4066198131b3dff4a48c8d447 Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Thu, 11 May 2017 17:32:41 +0200
Subject: babel-french: \frenchsetup is intended to replace \frenchbsetup;
 update the documentation

---
 arabluatex.dtx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'arabluatex.dtx')

diff --git a/arabluatex.dtx b/arabluatex.dtx
index 58904ea..03f8eb3 100644
--- a/arabluatex.dtx
+++ b/arabluatex.dtx
@@ -2929,14 +2929,14 @@ qAla barzawayhi bn-u 'azhar-a, ra's-u 'a.tibbA'-i fAris-a...
 % viz. |acadian|, |canadien|, |francais|, |frenchb| or |french| all
 % redefine the list environments, which breaks the standard definition
 % file that is used by \package{arabluatex}. Therefore,
-% \package{babel-french} must be loaded with the |StandardLayout=true|
+% \package{babel-french} must be loaded with the |StandardLists=true|
 % option, like so:---%
 % \iffalse
 %<*example>
 % \fi
 \begin{arabluaverbatim}
 \usepackage[french]{babel}
-\frenchbsetup{StandardLayout=true}
+\frenchsetup{StandardLists=true}
 \end{arabluaverbatim}
 % \iffalse
 %</example>
-- 
cgit v1.2.3

