From 3a507ecec035a656d16be9f7d0bb413eb0f9e8f2 Mon Sep 17 00:00:00 2001
From: Robert Alessi <alessi@robertalessi.net>
Date: Wed, 11 Nov 2020 09:54:05 +0100
Subject: check the renderer used for the Arabic font. (Thanks to M. Krueger
 and U. Fischer for telling me how do do this.)

---
 arabluatex.dtx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'arabluatex.dtx')

diff --git a/arabluatex.dtx b/arabluatex.dtx
index f7278f1..2972c0d 100644
--- a/arabluatex.dtx
+++ b/arabluatex.dtx
@@ -159,11 +159,11 @@
 \end{filecontents}
 \usepackage[letterpaper,margin=1.25in,left=50mm,nohead]{geometry}
 \usepackage{fontspec}
+\defaultfontfeatures{Renderer=Harfbuzz}
 \usepackage[english]{babel}
 \usepackage{dox}
 \doxitem{Option}{option}{options}
 \usepackage{microtype}
-\defaultfontfeatures{Renderer=Harfbuzz}
 \babelfont{rm}{Old Standard}
 \babelfont{sf}{NewComputerModern Sans}
 \babelfont{tt}{NewComputerModern Mono}
-- 
cgit v1.2.3

